#修改日志检索->国家代理->HTTP(S)阻断 url
UPDATE `sys_menu` SET `href`='/log/pxy/httpBlockLists?searchAction=16' WHERE  code='http_block' and href='/log/pxy/httpBlockList?searchAction=16' and permission= '';
#修改日志检索->国家代理->HTTP(S)监测 url
UPDATE `sys_menu` SET `href`='/log/pxy/httpMonitLists?searchAction=1' WHERE code='http_monit' and href='/log/pxy/httpMonitogs' and permission= '';

#实时报表->国家代理菜单和它下面的子菜单都置为失效
UPDATE `sys_menu` SET `del_flag`='0' WHERE href ='/report/list?cfgName=http_block';
UPDATE `sys_menu` SET `del_flag`='0' WHERE href ='/report/list?cfgName=http_redirect';
UPDATE `sys_menu` SET `del_flag`='0' WHERE href ='/report/list?cfgName=http_replace';
UPDATE `sys_menu` SET `del_flag`='0' WHERE href ='/report/list?cfgName=http_monit';
UPDATE `sys_menu` SET `del_flag`='0' WHERE `code`='Proxy' and parent_id='780';