/*
Navicat MariaDB Data Transfer

Source Server         : 192.168.10.204
Source Server Version : 100214
Source Host           : 192.168.10.204:3306
Source Database       : gwall_dev

Target Server Type    : MariaDB
Target Server Version : 100214
File Encoding         : 65001

Date: 2018-10-30 10:38:18
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for policy_group_info
-- ----------------------------
DROP TABLE IF EXISTS `policy_group_info`;
CREATE TABLE `policy_group_info` (
  `group_id` int(11) NOT NULL AUTO_INCREMENT,
  `group_name` varchar(500) NOT NULL,
  `create_time` datetime NOT NULL DEFAULT '0000-00-00 00:00:00',
  `editor_id` int(11) DEFAULT NULL,
  `creator_id` int(11) NOT NULL,
  `edit_time` datetime DEFAULT NULL,
  `group_type` int(2) DEFAULT NULL COMMENT '1:dns 2:ip复用, 4 asn',
  `is_valid` int(2) NOT NULL DEFAULT 1 COMMENT '-1删除 1有效 0无效',
  `service_group_id` int(11) DEFAULT NULL COMMENT '从综合服务获取的组号，用于存放asn的组号.由于group_id是自增的主键，从综合服务获取的组号会与之冲突',
  `asn_no` int(11) DEFAULT NULL COMMENT 'asn号',
  `description` varchar(200) DEFAULT '',
  PRIMARY KEY (`group_id`)
) ENGINE=InnoDB AUTO_INCREMENT=359 DEFAULT CHARSET=utf8mb4;
